Name: GetStatus_v - return the property dictionary of a random deviate generator

Synopsis:

rdvtype  GetStatus -&gt; dict


Description:

GetStatus returns a dictionary with the status information 
of the random deviate generator given as argument.  The information 
contained in the property dictionary depends on the particular 
generator. 
The random deviate can be a deviate implemented in C++ represented 
by rdvtype or a SLI level deviate represented by a dictionary. For 
the Latter case GetStatus is overloaded with GetStatus_d.


SeeAlso:

SetStatus_v
GetStatus_dict
CreateRDV
rdevdict

Source:

/var/www/debian/nest/nest-simulator-2.20.0/lib/sli/librandom.sli
