Name: RandomArray - Returns array with random numbers.

Synopsis:

rdvtype  n RandomArray -&gt; [r1 .. rn] 
dict     n             -&gt; [r1 .. rn]


Description:

Returns an array with n random numbers drawn from a random 
deviate generator.  The random deviate can be a deviate 
implemented  in C++ represented by rdvtype or a SLI level deviate 
represented by a dictionary.


SeeAlso:

Random
CreateRDV
rdevdict

Source:

/var/www/debian/nest/nest-simulator-2.20.0/lib/sli/librandom.sli
