Name: ResetOptions - Reset all options of a command to their default values.

Synopsis:

/f ResetOptions -&gt; -


Description:

Usually, a C++-like notation is used to indicate the 
availability of the function, if the function is defined in some 
"namespace" dictionary. 
For example: "arr::Mean".


Author:

Ruediger Kupper


FirstVersion:

28.3.2003, by copy-paste-and-modify from RestoreOptions


SeeAlso:

GetOption
GetOptions
ShowOptions
SetOptions
Options
SaveOptions
RestoreOptions
OptionsDictionary

Source:

/var/www/debian/nest/nest-simulator-2.20.0/lib/sli/mathematica.sli
