Name: clic - Start measuring interpreter cycles.

Description:

clic/cloc can be used to measure the number of 
milliseconds per interpreter cycle. 
The result includes also the cycles taken up by the


SeeAlso:

cloc
tic
toc

Source:

/var/www/debian/nest/nest-simulator-2.20.0/lib/sli/sli-init.sli
