Name: cvgidcollection - Create a container of global ids.

Synopsis:

list_of_gids          cvgidcollection -&gt; gidcollection 
first_gid    last_gid cvgidcollection -&gt; gidcollection


Description:

This function creates a gidcollection object, which is a unified 
representation for multiple global ids of neurons or devices. To 
save memory in the case of contiguous ranges of GIDs, it is 
possible to just use the first and last index of the range to 
initialize the gidcollection.


Parameters:

list_of_gids    - an array or intvector of global ids, or a gidcollection 
first_gid       - an integer definig the first GID of the range 
last_gid        - an integer definig the last GID of the range


Author:

Jochen Martin Eppler


FirstVersion:

April 2014


SeeAlso:

cv_iv
Connect
CGConnect

Source:

/var/www/debian/nest/nest-simulator-2.20.0/lib/sli/nest-init.sli
