Name: is_mpi - flag in statusdict indicating whether interpreter was compiled with MPI

Synopsis:

statusdict/is_mpi :: -&gt; boolean


Description:

The C++ startup of a SLI interpreter which is not compiled with MPI support may 
be completely unaware of distributed computing and may therefore not define the /is_mpi 
flag. In order to simplify user code, processes.sli sets /is_mpi to false if it is 
not defined.


Author:

Diesmann


FirstVersion:

090412


SeeAlso:

statusdict

Source:

/var/www/debian/nest/nest-simulator-2.20.0/lib/sli/processes.sli
