Name: is_threaded - returns true if NEST/SLI was compiled with thread support

Synopsis:

is_threaded -&gt; bool


Description:

Returns true if NEST/SLI was compiled with support for threads, and returns 
false otherwise.


SeeAlso:

statusdict

Source:

/var/www/debian/nest/nest-simulator-2.20.0/lib/sli/sli-init.sli
