Name: isatty - Determine if a stream is connected to a terminal.

Synopsis:

stream isatty -&gt; false|true


Description:

Alternatives: Functions isatty_is for istreams, isatty_os 
for osstreams (both undocumented) -&gt; behaviour and synopsis are the same.


Remarks:

This is a wrapper to the POSIX kernel function istty().


SeeAlso:

ctermid

Source:

/var/www/debian/nest/nest-simulator-2.20.0/lib/sli/processes.sli
