Name: memory_thisjob - report virtual memory size for current NEST proce

Synopsis:

memory_thisjob -&gt; vmsize


Description:

This function returns the virtual memory size (VmSize) for the current NEST 
process by checking the /proc filesystem. VmSize is reported in kB.


Source:

/var/www/debian/nest/nest-simulator-2.20.0/lib/sli/processes.sli
