Name: ms2hms - Convert milliseconds to an array  [h min sec].

Synopsis:

ms ms2hms -&gt; [h min sec] 
Converts the given number of milliseconds into 
an array containing the corresponding number 
of hours minutes and seconds


SeeAlso:

tic
toc

Source:

/var/www/debian/nest/nest-simulator-2.20.0/lib/sli/sli-init.sli
