Name: skip_if_* - End script and report it as skipped

Synopsis:

skip_if_* -&gt; -


Description:

These functions will terminate NEST/SLI with a return code signaling that the 
script was skipped. It should be used to leave test/example scripts that have 
special prerequisites.


SeeAlso:

exit_test_gracefully

Source:

/var/www/debian/nest/nest-simulator-2.20.0/lib/sli/sli-init.sli
