Name: sleep - Pauses current process.

Synopsis:

t sleep -&gt; -


Examples:

5 sleep %wait for 5 seconds 
tic 2.75 sleep toc = %should print 2.75


Description:

Pauses the process for t seconds. t can be integer or double. 
Resolution is given by pclockspersec.


Author:

Schrader


SeeAlso:

realtime
tic
toc
ptimes
pclockspersec
clic
cloc

Source:

/var/www/debian/nest/nest-simulator-2.20.0/lib/sli/sli-init.sli
