Name: testsuite::issue-105 - Ensure that min_delay and max_delay are set correctly

Synopsis:

(issue-105) run -&gt; NEST exits if test fails


Description:

This ticket ensures that NEST sets min_delay and max_delay correctly also for 
delays that are not multiples of the resolution.


Author:

Hans E Plesser, 2015-12-01 based on material by Jafet Diaz


Source:

/var/www/debian/nest/nest-simulator-2.20.0/testsuite/regressiontests/issue-105.sli
