Synopsis:

(issue-1140) run -&gt; NEST exits if test fails


Description:

Tests if parameters for inhomogeneous_poisson_generator can be set with empty 
arrays for rate_times and rate_values.


Author:

Håkon Mørk


FirstVersion:

March 2019


Source:

/var/www/debian/nest/nest-simulator-2.20.0/testsuite/regressiontests/issue-1140.sli
