Synopsis:

(issue-1212) run -&gt; NEST exits if test fails


Description:

This test makes sure that using a weight recorder with a probabilistic 
synapse that drops a spike doesn't result in a segfault.


Author:

Håkon Mørk


FirstVersion:

January 2020


Source:

/var/www/debian/nest/nest-simulator-2.20.0/testsuite/regressiontests/issue-1212.sli
