Synopsis:

(issue-1366) run -&gt; NEST exits if test fails


Description:

This tests checks that we are able to connect with fixed_total_number equal to 1 
when we have more than 1 virtual process and more than 1 node per process.


Author:

Stine Brekke Vennemo


FirstVersion:

December 2019


Source:

/var/www/debian/nest/nest-simulator-2.20.0/testsuite/regressiontests/issue-1366.sli
