Name: testsuite::issue-264 - Ensure error is raised on times incommensurate with resolution

Synopsis:

(issue-264) run -&gt; NEST exits if test fails


Description:

This test ensures that NEST raises an error if the requested simulation 
time is not a multiple of the resolution, or if one attempts to set 
start/stop/origin for devices that are not multiples of the resolution.


Author:

Hans E Plesser, 2016-03-08


Source:

/var/www/debian/nest/nest-simulator-2.20.0/testsuite/regressiontests/issue-264.sli
