Name: testsuite::issue-281 - Check that ConnectLayers works MPI-parallel for fixed fan-out

Synopsis:

(issue-281) run -&gt; NEST exits if test fails


Description:

This test connects a layer with itself with fixed fan-out. 
The test should pass with any number of MPI processes.


Author:

Hans Ekkehard Plesser, 2016-03-18


Source:

/var/www/debian/nest/nest-simulator-2.20.0/testsuite/mpitests/issue-281.sli
