Name: testsuite::issue-327 - Ensure that spike_generator handles large precise time

Synopsis:

(issue-327) run -&gt; NEST exits if test fails


Description:

This test ensures that NEST handles round-off correctly also for large, 
precise spike times.


Author:

Hans E Plesser, 2016-05-03


Source:

/var/www/debian/nest/nest-simulator-2.20.0/testsuite/regressiontests/issue-327.sli
