Name: testsuite::issue-410 - Ensure thread safety of volume transmitter

Synopsis:

(issue-410) run -&gt; NEST exits if test fails


Description:

This test compares the impact of the volume transmitter 
on a dopamine synapse using different number of threads.


Author:

Till Schumann


FirstVersion:

07/2016


Source:

/var/www/debian/nest/nest-simulator-2.20.0/testsuite/regressiontests/issue-410.sli
