Name: testsuite::issue-521 - *_hpc connections return local id instead of global id of target neuron

Ensure that *_hpc connections also return correct global target GID on GetConnections.

Author:

Till Schumann


FirstVersion:

04/2017


Source:

/var/www/debian/nest/nest-simulator-2.20.0/testsuite/regressiontests/issue-521.sli
