Synopsis:

(issue-527) run -&gt; NEST exits if test fails


Description:

This test ensures that NEST raises an error if the user tries to use 
DataConnect in multithreaded mode.


Author:

Stine B. Vennemo


FirstVersion:

July 2017


SeeAlso:


Source:

/var/www/debian/nest/nest-simulator-2.20.0/testsuite/regressiontests/issue-527.sli
