Synopsis:

(issue-565) run -&gt; NEST exits if test fails


Description:

This test provokes a switch from a heterogeneous connector to a 
homogeneous connector using the structural plasticity framework and 
asserts that the resulting homogeneous connector is correctly used.


Author:

Jakob Jordan


FirstVersion:

November 2016


SeeAlso:


Source:

/var/www/debian/nest/nest-simulator-2.20.0/testsuite/unittests/issue-565.sli
