Name: testsuite::issue-600 - Checks that waveform relaxation works with MPI

Synopsis:

(issue-600) run -&gt; -


Description:

issue-600.sli ensures that the iterative solution scheme in NEST still works when 
neurons that use waveform relaxation are only present on a subset of all available 
MPI processes. The test is a slightly changed version of test_gap_junctions_mpi.sli.


Author:

Jan Hahne, Hans Ekkehard Plesser


SeeAlso:

testsuite::test_gap_junctions_mpi
hh_psc_alpha_gap
gap_junction

Source:

/var/www/debian/nest/nest-simulator-2.20.0/testsuite/mpitests/issue-600.sli
