Synopsis:

(issue-707) run -&gt; NEST exits if test fails


Description:

This test ensures that the weight of gap junctions can 
be recorded with the weight_recorder (thus that SecondaryEvents 
have a properly set time stamp).


Author:

Jan Hahne


FirstVersion:

April 2017


SeeAlso:


Source:

/var/www/debian/nest/nest-simulator-2.20.0/testsuite/regressiontests/issue-707.sli
