Synopsis:

(issue-735) run -&gt; NEST exits if test fails


Description:

This test ensures that NEST raises an error if the user tries to 
set stdp parameters that cannot be set on stdp_dopamine_synapse.


Author:

Hans Ekkehard Plesser


FirstVersion:

May 2017


SeeAlso:


Source:

/var/www/debian/nest/nest-simulator-2.20.0/testsuite/regressiontests/issue-735.sli
