Synopsis:

(issue-737-threads) run -&gt; NEST exits if test fails


Description:

This test ensures that NEST raises an error if the user tries to 
set c or n in the stdp_dopamine_synapse specification given to the Connect call 
when we have more than one thread.


Author:

Stine B. Vennemo


FirstVersion:

May 2017


SeeAlso:

testsuite::issue-735
testsuite::issue-737

Source:

/var/www/debian/nest/nest-simulator-2.20.0/testsuite/regressiontests/issue-737-threads.sli
