Synopsis:

(issue-737) run -&gt; NEST exits if test fails


Description:

This test ensures that NEST raises an error if the user tries to 
set synapse parameters that cannot be set with Connect calls.


Author:

Stine B. Vennemo


FirstVersion:

May 2017


SeeAlso:

testsuite::issue-735

Source:

/var/www/debian/nest/nest-simulator-2.20.0/testsuite/regressiontests/issue-737.sli
