Synopsis:

(issue-740) run -&gt; NEST exits if test fails


Description:

This test ensures that step_current_generator can only be parameterized 
with amplitude_times that are strictly increasing after conversion to 
time steps.


Author:

Hans Ekkehard Plesser


FirstVersion:

August 2017


Source:

/var/www/debian/nest/nest-simulator-2.20.0/testsuite/regressiontests/issue-740.sli
