Name: testsuite::issue-888 - Ensure that the resolution is set as a multiple of tics.

Synopsis:

(issue-888) run -&gt; NEST exits if test fails


Author:

Håkon Mørk, 2018-03-05


Source:

/var/www/debian/nest/nest-simulator-2.20.0/testsuite/regressiontests/issue-888.sli
