Name: testsuite::test_DataConnect - li script to test if DataConnect works as expected

Synopsis:

(test_DataConnect) run


Description:

This test generates 100 iaf_psc_alpha neurons and creates 
a connectivity vector per neuron


Author:

Marc-Oliver Gewaltig


FirstVersion:

May 2012


SeeAlso:

DataConnect

Source:

/var/www/debian/nest/nest-simulator-2.20.0/testsuite/unittests/test_DataConnect.sli
