Name: testsuite::test_ac_generator - test that ac_generator provides correct current

Synopsis:

(test_ac_generator) run


Description:

This testscript checks tests that the ac_generator provides the correct 
current by comparing with a neuron driven by a step-current input 
corresponding to the current expected from the ac_generator.


Author:

Hans Ekkehard Plesser


FirstVersion:

May 2017


Source:

/var/www/debian/nest/nest-simulator-2.20.0/testsuite/unittests/test_ac_generator.sli
