Name: testsuite::test_add_freeze_thaw - test that per-thread nodes vectors are updated

Synopsis:

(test_add_freeze_thaw.sli) run -&gt; dies if assertion fails


Description:

1. Create nodes driven by internal current, simulate, check V_m changes. 
2. Add more nodes, reset old nodes, simulate again, check V_m changes for all. 
3. Freeze half the nodes, simulate, check their V_m is constant. 
4. Thaw nodes, simulate, check V_m changes again.


Author:

Plesser


FirstVersion:

2014-11-05


Source:

/var/www/debian/nest/nest-simulator-2.20.0/testsuite/unittests/test_add_freeze_thaw.sli
