Name: testsuite::test_connect - SLI script to test runability of all Connect variant

Synopsis:

(test_connect) run


Description:

Tests if all variants of Connect can be run. This test checks the 
outcome of the calls only in a minimal way. A more comprehensive 
set of tests is available in PyNEST. It also checks the given 
parameters more thoroughly and looks at statistics of the resulting 
connectivity.


Author:

Jochen Martin Eppler


FirstVersion:

April 2014


SeeAlso:

Connect

Source:

/var/www/debian/nest/nest-simulator-2.20.0/testsuite/unittests/test_connect.sli
