Name: testsuite::test_conngen_interface - Test runability of all CGConnect variant

Synopsis:

(test_conngen_interface) run


Description:

Tests if all variants of CGConnect can be run. This test only checks the 
SLI part of the ConnectionGenerator interface. The PyNEST interface is 
tested in pynest/nest/tests/test_csa.py.


Author:

Jochen Martin Eppler


FirstVersion:

June 2016


SeeAlso:

CGConnect

Source:

/var/www/debian/nest/nest-simulator-2.20.0/examples/nest/conngen_interface.sli
