Name: testsuite::test_cont_delay_synapse - test of synapse with continuous delay

Synopsis:

(test_cont_delay_synapse) run -&gt; -


Description:

A minimal test for the continuous delay synapse.


References:




Author:

Plesser


FirstVersion:

June 2015


SeeAlso:

cont_delay_synapse

Source:

/var/www/debian/nest/nest-simulator-2.20.0/testsuite/unittests/test_cont_delay_synapse.sli
