Name: testsuite::test_copymodel - li script to test if CopyModel works as expected

Synopsis:

(test_copymodel) run


Description:

This test generates several copies of node and synapse models, sets 
their parameters and compares the results for consistency.


Author:

Jochen Martin Eppler


FirstVersion:

September 2008


SeeAlso:

CopyModel
GetDefaults
SetDefaults

Source:

/var/www/debian/nest/nest-simulator-2.20.0/testsuite/unittests/test_copymodel.sli
