Name: testsuite::test_cvi - check if cvi function work

Synopsis:

(test_cvi) run -&gt;


Description:

Tests basic properties of cvi. Note that the tests 
are directly compiled from the the Examples section of 
the documentation which is evaluated by the command 
/validate . 
Future versions of NEST should generate this test 
directly from the Examples section.


Author:

130610, Diesmann


SeeAlso:

floor
round

Source:

/var/www/debian/nest/nest-simulator-2.20.0/testsuite/unittests/test_cvi.sli
