Name: testsuite::test_dcgen_versus_I_e - li script to test if setting I_e and applying a DC generator yields the same results.

Synopsis:

(test_dcgen_versus_I_e) run


Description:

This testscript checks consistency between currents coming from dc_generator and internal variable I_e; 
The approach is to simulate both situations for some time and compare membrane potentials at the end; 
Any model which supports current events and setting I_e is checked, other models are skipped.


Author:

Sven Schrader


FirstVersion:

January 2011


SeeAlso:

testsuite::test_iaf_i0

Source:

/var/www/debian/nest/nest-simulator-2.20.0/testsuite/unittests/test_dcgen_versus_I_e.sli
