Name: testsuite::test_default_delays_weights - test default delay and weight handling

Synopsis:

(test_default_delays_weights) run


Description:

Test that correct delays and weights are set if synaptic defaults 
are given or overridden. This in particular also tests that NaN-detection works 
on an architecture (see Github #127).


Author:

Ippen, Plesser, Hahne


FirstVersion:

October 2015


Source:

/var/www/debian/nest/nest-simulator-2.20.0/testsuite/unittests/test_default_delays_weights.sli
