Name: testsuite::test_delay_after_res_change - li script to test delay after the resolution has changed

Synopsis:

(test_delay_after_res_change) run


Description:

This script checks that the min and max delays and the default delays 
are still correct after the resolution has changed.


Author:

Tammo Ippen


FirstVersion:

Oct 2015


Source:

/var/www/debian/nest/nest-simulator-2.20.0/testsuite/unittests/test_delay_after_res_change.sli
