Name: testsuite::test_dirname - tests dirname from filesystem.sli for POSIX conformance

Synopsis:

(test_dirname) run


Description:

This test runs the dirname test cases from coreutils distribution.


Author:

Yury V. Zaytsev


FirstVersion:

November 2012


SeeAlso:

dirname

Source:

/var/www/debian/nest/nest-simulator-2.20.0/testsuite/unittests/test_dirname.sli
