Name: testsuite::test_fail - test if SLI returns exit code 126 when executing a file with unhandled errors.

Synopsis:

(test_fail) run -&gt;


Description:

This script provokes an error that is not handled by any user error 
handler. It is used to test if SLI quits with exit code 126 after 
executing a file that contains errors.


Remarks:

Yes, this script is really meant to fail!


Author:

Ruediger Kupper


FirstVersion:

03-jul-2008


SeeAlso:

testsuite::test_pass
testsuite::test_fail
testsuite::test_stop
testsuite::test_goodhandler
testsuite::test_lazyhandler
testsuite::test_badhandler

Source:

/var/www/debian/nest/nest-simulator-2.20.0/testsuite/selftests/test_fail.sli
