Name: testsuite::test_fast_operators - ensures that internal operators do not check number of argument

Synopsis:

(test_fast_operators) run


Description:

User level operators like add and pop in SLI are safe in the sense that a StackUnderflow error is 
raised if the stack does not contain a sufficient number of arguments. The user can then inspect the 
state of the interpreter and solve the problem. In machine generated SLI code, however, checking the 
number of arguments is unnecessary.


Author:

Diesmann


FirstVersion:

090227


Source:

/var/www/debian/nest/nest-simulator-2.20.0/testsuite/unittests/test_fast_operators.sli
