Name: testsuite::test_gap_junction - Ensure that gap_junction connection can only be created between neurons which support them.

Synopsis:

(test_gap_junction) run -&gt; NEST exits if test fails


Description:

Ensure that NEST throws an exception if one tries to create illegal gap-junction connections. 
Furthermore it is checked that the delay cannot be set for gap-junction connections.


Author:

Jan Hahne, October 2015


SeeAlso:

testsuite::test_hh_psc_alpha_gap
hh_psc_alpha_gap
gap_junction

Source:

/var/www/debian/nest/nest-simulator-2.20.0/testsuite/unittests/test_gap_junction.sli
