Name: testsuite::test_gap_junctions_mpi - Test gap junction functionality in parallel

Synopsis:

(test_gap_junctions_mpi) run -&gt; -


Description:

test_gap_junctions_mpi.sli is an overall test of the hh_psc_alpha_gap model connected 
by gap_junction connection. The test checks if the gap junction functionality 
works in parallel.


Author:

Jan Hahne, Hans Ekkehard Plesser


SeeAlso:

testsuite::test_gap_junction
hh_psc_alpha_gap
gap_junction

Source:

/var/www/debian/nest/nest-simulator-2.20.0/testsuite/mpitests/test_gap_junctions_mpi.sli
