Name: testsuite::test_getrng_neuron - li script of assignment of rng to neuron

Synopsis:

nest_indirect test_getrng_neuron.sli -&gt; compare results for different numbers of jobs


Description:

The scripts test whether in simulations distributed over different numbers of 
processors the assignment of the global id and the random number generator stay 
the same. 
See #336 for discussion.


Author:

July 2009, Diesmann


SeeAlso:

unittest::distributed_assert_or_die

Source:

/var/www/debian/nest/nest-simulator-2.20.0/testsuite/mpitests/test_getrng_neuron.sli
