Name: testsuite::test_gif_cond_exp - li script for test of gif_cond_exp with
external DC current and spike generator

Synopsis:

(test_gif_cond_exp) run


Description:

This testscript checks the correctness of gif_cond_exp neuron model. It 
injects external DC current and also three spikes to neuron and measures its 
spike times. The spike times should match the expected values. The expected 
spike times are computed by the Python code used for the publication 
(Code/GIF.py in http://wiki.epfl.ch/giftoolbox/documents/GIF_Toolbox.zip). 
In order to use the Python code, the adaptation parameters (q_stc/sfa) should 
be converted using the formula described in the model documentation.


Author:

March 2016, Setareh


SeeAlso:

gif_cond_exp
testsuite::test_gif_cond_exp_multisynapse

Source:

/var/www/debian/nest/nest-simulator-2.20.0/testsuite/unittests/test_gif_cond_exp.sli
