Synopsis:

(test_ginzburg_and_mcculloch) run -&gt; NEST exits if test fails


Description:

This test ensures that we are able to connect a ginzburg_neuron with a 
mcculloch_pitts_neuron and that we can then run a simulation.


Author:

Stine B. Vennemo


FirstVersion:

May 2018


SeeAlso:


Source:

/var/www/debian/nest/nest-simulator-2.20.0/testsuite/unittests/test_ginzburg_and_mcculloch.sli
