Name: testsuite::test_global_rng - check whether global rng gives consistent result

Synopsis:

nest_indirect test_global_rng.sli -&gt; compare results for different numbers of jobs


Description:

The scripts test whether in simulations distributed over different numbers of 
processors the global random number generator gives identical results on all 
jobs and for different numbers of jobs. 
See #186 for discussion.


Author:

July 2009, Diesmann


SeeAlso:

unittest::distributed_assert_or_die

Source:

/var/www/debian/nest/nest-simulator-2.20.0/testsuite/mpitests/test_global_rng.sli
